<template>
  <fieldset>
    <div>
      <label for=measureType>Type</label>
      <select
        :disabled=disabled
        name=measureType
        v-model=value.type>
        <option value=simple>Simple</option>
        <option value=list>List</option>
      </select>
    </div>
    <div>
      <label for=measureIsVisible>Show by default.</label>
      <input type=checkbox v-model=value.isVisible :disabled=disabled />
    </div>
    <!--<ListMeasureConfigForm :config=config v-show="config.type === 'list'"/>-->
  </fieldset>
</template>
<script lang=ts src=./measure-config-form.ts></script>
<style lang=scss src=./measure-config-form.scss></style>
