<template>
  <div class=simple-details>
    <apex-chart type="line" :options=chartOptions :series=measurementChartData />
    <v-table :data=measurementTableData>
      <thead slot=head >
        <tr>
          <v-th sortKey=tsSort defaultSort=asc >Timestamp</v-th>
          <v-th sortKey=value >{{measure.name}}</v-th>
        </tr>
      </thead>
      <tbody slot=body slot-scope={displayData} >
        <tr v-for="row in displayData" :key="row.id">
          <td>{{row.tsDisplay}}</td>
          <td>{{row.value}}</td>
        </tr>
      </tbody>
    </v-table>
    <SimpleEntry :measure=measure v-model=
  </div>
</template>
<script lang="ts" src="./simple-details.ts"></script>
<style lang="scss" src="./simple-details.scss"></style>
