-- DROP DATABASE IF EXISTS nlsongs;
CREATE DATABASE nlsongs
    ENCODING = 'UTF8'
    LC_COLLATE = 'en_US.UTF-8'
    LC_CTYPE = 'en_US.UTF-8'
    CONNECTION LIMIT = 1;

\c nlsongs
